
    ADD SCHEDULED BACKUP

    The Scheduled Backup Add window contains the following fields:

    Backup Name

    Use this field to specify the backup's name.

    Description

    Use this field to provide a brief description of the backup.

    Backup Device

    Use this field to specify the logical device name for the backup.
    Logical device names are defined via the Configure Devices window
    (see "Configure Devices" on page 6-2). You can also click on the
    arrow button to the right to bring up a list of all defined device
    names and select one of them.

    Catalog Name

    If you have enabled backup catalogs, specify in this field which
    catalog will be used to keep a record of this backup. See the
    Catalog function in the Session Preferences menu item (see"Session
    Preferences" on page 2-2 for more details).

    Backup Type

    These toggle buttons specify whether to run an Incremental or Full
    backup. The Incremental backup choice will also activate the Backup
    files CHANGED toggle buttons.

    Backup files CHANGED

    This set of toggle buttons specifies which files should be backed up
    during an Incrementally backup. The options are files that have
    changed:

    + Since Last Full Backup (the default)
    + Since Last Incremental Backup
    + Within time period

    The Within time period choice will also activate the Number of Days
    field so you can specify a time period.

    Number of Days

    You can use this field to specify how many days back Enlighten will
    check to see if a file has changed and therefore should be backed
    up. The arrow buttons to the right will automatically increment or
    decrement the number displayed in the text field.

    Remain in partition

    Use this option to select whether you want the backup to cover only
    the immediately defined partition for a particular directory (Yes)
    or all partitions listed under that directory (No). The default is
    Yes.

    **File List**

    Use this list box to enter which files will be checked for changes.
    Those which have changed will then be the backed up as specified in
    the preceding fields.

    Time of Backup

    You can use this field with the Schedule Type toggle buttons to
    determine when a backup should be executed. See the Schedule Type
    field description below for more details on how this field is used.

    Schedule Type

    This set of toggle buttons determines how and when the backup will
    occur. The choices are:

    + Weekly The days of the week will be displayed. Select which days
      the backups should occur. Enter when the backup will occur in the
      Time of Backup field.

    + Monthly The days of the month will be displayed. Select which days
      the backups should occur. Enter when the backup will occur in the
      Time of Backup field.

    + Manual This option does not schedule a time to perform the backup;
      you run it by selecting the Execute Now button in the Scheduled
      Backup Configuration parent window.

    + One time Specify a (one time) date and time to run the backup in
      the Time of Backup field.

    To specify a time/date value, see "TIME FORMATS" on page C-1.

    Buttons

    The Scheduled Backup Add window contains the following buttons:

    Add

    Click on this button to create the scheduled backup defined by the
    rest of this window's fields.


    Clear Fields

    Click on this button to clear the existing choices in all fields.

    Execute Now

    Click on this button to execute the highlighted backup immediately.
    This occurs regardless of the backup's defined schedule time.

    Close

    Click on this button to close the window without saving any
    scheduled backup information.

